Section 12.7 PILOT MAINTENANCE The ability for Recreational Pilot Certificate holders to conduct pilot maintenance on certain RAAus aircraft, including aircraft used for hire or reward, subject to certain criteria.
Section 11.2.2 RAAus MAINTENANCE AUTHORITIES The ability for specially qualified CASA LAMEs and CASA Part 11 authorised persons to conduct certain specialised maintenance tasks without the need to obtain an RAAus L2 maintenance authorisation, including instrument calibration, composite inspections and repairs, welding, and avionics work.
Section 11.6 CRITERIA FOR ASSESSMENT FOR LEVEL FOUR (L4) AMATEUR BUILT INSPECTOR The ability for RAAus to issue Level 4 (L4) Amateur-Built inspector approvals to non-CASA LAME Licence holders which previously required approval by CASA.
Section 15.1 LIGHTWEIGHT AEROPLANES The registration and maintenance requirements for RAAus Group G Aircraft (Lightweight Aeroplanes).
RAAus Technical Manual
Version 4.1 vs 4.3 Difference
Document Metadata	RAAus Technical Manual 4.1 vs 4.3 Difference
hosted at: https://raaus-documentation.gitlab.io/raaus-documentation
source hosted at: https://gitlab.com/raaus-documentation/raaus-documentation
last updated at time: 2025-10-09 21:34:38 UTC by Tony Morris <tonymorris@gmail.com>
revision: 7871ff77d83b488e2c91324435434cd6f82e7137	Page 1 of 1
access control: public